-- Only testdata. Shoul dnot be inserted in PROD!!
USE sts_audconf;

insert into trustedCvr (cvr, endpoint) values ('46837428', 'STS');
insert into trustedCvr (cvr, endpoint) values ('33257872', 'STS');
insert into trustedCvr (cvr, endpoint) values ('99900499', 'STS');
